HELP SCREEN WHEN R6 IS ACTIVATED
F1 key:      Help Screen for these special keys
F2 key:      R612 (The 12 means 1st com file, 2nd function key)
F3 key:      R613
F4 key:      R614
F5 key:      R615
F6 key:      R616
F7 key:      R617
F8 key:      R618
F9 key:      R619
F10 key:     Redefinition command of function keys
Alt F1 key:  Smaller Help Screen
Alt F2 key:  R622
Alt F3 key:  R623
Alt F4 key:  R624
Alt F5 key:  R625
Alt F6 key:  R626
Alt F7 key:  R627
Alt F8 key:  R628
Alt F9 key:  Initiates the KEY setup with the small help screen
Alt F10 key: R630
